
DIN Is Noise 
Copyright (c) 2006-2017 Jagannathan Sampath <jag@dinisnoise.org>.

Binaural Drones

DIN creates binaural drones in pairs. The first drone sounds into your
left ear, the second drone sounds into your right ear and so on. So, 
you need to hear this on headphones :) The drones of a pair are 
separated by a small pitch (set with Separation)

DIN can make binaural drone pairs starting at a pitch (100 Hz as 
default), with any separation between the drones of a pair eg., 1 Hz.

DIN can also make binaural drone pairs on the notes of the scale starting
at the key note. The key note can be the starting pitch or can be the 
key note you set on the Settings page. Set the notes of the scale on the 
Settings page.

Turn on Close Octave to create a binaural pair on the octave note.

Resize separation to vary the separation between left and right drones
so that their absolute pitch falls on the notes of the scale.

Press 2 or Menu > Editors > Waveform to edit the waveform driving all 
the binaural drone pairs.

Master Volume controls the overall loudness of all the binaural drones.

Fade time in seconds is the time taken to fade in/out when creating, 
destroying or syncing the drones.

Sync All Drones brings all the binaural drones in phase. Useful to resolve
flare ups to max (and distortion beyond). 

Keep the Compressor and Delays off.

Recording:

CTRL + ENTER - to start/stop sound recording
or Click on the Record button at the bottom of the microtonal-keyboard

ALT + ENTER - clear existing recording
or choose Menu > File > Clear

Menu > File > Save to save the recording as a .WAV file on the desktop.

Console:

TAB : enter/leave command mode
UP_ARROW / DOWN_ARROW: scroll up/down
SHIFT + UP_ARROW / DOWN_ARROW: scroll up/down command history

In command mode, type help to reveal available commands. Or type
help command_name to get help for a particular command.

PgUp, PgDn: page up, page down
BACKSPACE : delete all text in console
` : fold/unfold console
