
DIN Is Noise 
Copyright (c) 2006-2017 Jagannathan Sampath <jag@dinisnoise.org>.

Binaural Drones

DIN creates binaural drones in pairs. The first drone goes into your
left ear, the second drone goes into your right ear and so on. So, 
you need to hear this on headphones :) The drones of a pair are 
separated by a small pitch (set with Separation)

DIN can make binaural drone pairs starting at a pitch (100 Hz as 
default), with separation between the drones of a pair as low as 
1 Hz.

DIN can also make binaural drone pairs on the notes of the scale starting
at the key note. You can set the key note and the other notes of the 
scale in the Settings page.

The key note can be the starting pitch or can be the key note of the
scale.

Turn on Close Octave to create a binaural pair on the octave note.

Resize separation to vary the separation between left and right drones
so that their absolute pitch falls on the notes of the scale.

Press 2 or Menu > Editors > Waveform to edit the waveform driving all 
the binaural drone pairs.

Master Volume controls the overall loudness of all the binaural drones.

Fade time in seconds is the time taken to fade in/out when creating, 
destroying or syncing the drones.

Sync All Drones brings all the binaural drones in phase. Useful to resolve
flare ups to max (and distortion beyond). 

Keep the Compressor and Delays off.

Recording:

CTRL + ENTER - to start/stop sound recording
or Click on the Record button at the bottom of the microtonal-keyboard

LALT + ENTER - clear existing recording
or choose Menu > File > Clear

Menu > File > Save to save the recording as a .WAV file on the desktop.

Console:

TAB : enter/leave command mode
UP_ARROW / DOWN_ARROW: scroll up/down
LSHIFT + UP_ARROW / DOWN_ARROW: scroll up/down command history

In command mode, type help to reveal available commands. Or type
help command_name
to get help for a particular command.

PgUp, PgDn: page up, page down
BACKSPACE : delete all text in console
` : fold/unfold console
